By: Lucy

I received the H1N1 shot on 11/23/09. I was 8 weeks 6 Days and my baby died that day!

I have done research and went to the health dept where my shot was administed and got the lot number. I am shocked to know the vaccine contains toxic ingredients. They are:

. MF59C.1 is an oil/water emulsion containing 9.75 mg squalene, 1.175 mg polysorbate 80 and 1.175 mg sorbitan trioleate in a citrate buffer. Quantities are expressed per 0.5 ml vaccine dose.

– Other Ingredients:

The other ingredients are: thiomersal (MERCURY) (multidose vial only), sodium chloride, potassium chloride, potassium dihydrogen phosphate, disodium phosphate dihydrate, magnesium chloride hexahydrate, calcium chloride dihydrate, sodium citrate, citric acid and water for injections.

If any of you have had adverse reactions to this vaccine PLEASE report it online at https://vaers.hhs.gov/esub/index

Also, I am trying to find someone who KNOWS what tests can be ran on my fetus at this early stage to determine EXACTLY if this vaccine contibuted to my fetusâ death. Please email me if you can help.
info@timothystonefamily.com